Central Station Axis Interface

124+5 V

5124+5 V

5H372

1LFor each telescope axis69

5+5 Vfrom telescopelimit interface

push button

From telescopelimit interface

48555483

672To axis interfacein Anorad cabinetDB-9 maleDB-9 female

9For each short delay-line

124+5 VF15

124+5 V5

37++--

(cut connection topin 3 of DB-9)

+5 V

(cut connection topin 1 of HP4N46)

2618495

17236726 LS 31

HF2 (universal ready)193245

+5 V from Galilpowering H, F2, and 26 LS 3x5

2167358495

DB-9 fem.DB-9 fem.++--26 LS 32To axis interfacein Anorad cabinet

FromDrawing by S�bastien Morel, October 20006

: Suggested modification 1DB-15 male

(connection by strap. Cut connection 1

: Suggested modification 2All Stop